/bin/cp -r /dev/shm/1/ /dev/shm/c 2,342,940,666,870 bytes x ms

ms 0.0 20000.0 40000.0 60000.0 bytes

0M 5M 10M 15M 20M 25M 30M 35M 40M 45M 50M

x804FC0F:???

stack(s) heap-admin x8051A12:???